sst (˚C)

80˚W

80˚W

75˚W

75˚W

70˚W

70˚W

65˚W

65˚W

60˚W

60˚W

55˚W

55˚W

50˚W

50˚W

45˚W

45˚W

40˚W

40˚W

30˚N

30˚N

35˚N

35˚N

40˚N

40˚N

45˚N

45˚N

10 12 14 16 18 20 22 24 26 28 30 32

1995 195